1300 1400 1500 1600 1700 Time bin

6−10

5−10

4−10

3−10

Trigger probability

scan Y V0M

ALICE = 5.02 TeV NNs Pb, −Pb

Y

ALI-PUB-569725

ALI-PUB-569725